# Database access & configuration file
# Last updated: Fri Aug 31 13:04:07 2007
# Created by GT::SQL $Revision: 1.111 $
{
	'PREFIX' => 'glinks_',
	'PrintError' => '0',
	'RaiseError' => '0',
	'database' => 'slowtwitch',
	'def_path' => '/var/home/slowtwitch/slowtwitch.com/cgi-bin/articles/admin/defs',
	'driver' => 'mysql',
	'host' => '192.168.1.10',
	'login' => 'slowtwitch',
	'obj_cache' => '1',
	'password' => 'k9volqlAcpq',
	'port' => undef
};

# vim:syn=perl:ts=4:noet
